-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.250072419057
cusum  =  0.119392840952
eta  =  0.643080467337
hl_amp_ratio  =  0.71442817092
kurtosis  =  -1.13709552259
n_points  =  312
period  =  0.667188756536
period_SNR  =  37.3648010898
period_log10FAP  =  -39.2914699619
period_uncertainty  =  0.000126380659857
phase_cusum  =  0.272842465173
phase_eta  =  0.188626886524
phi21  =  1.19938329343
phi31  =  2.54996759851
quartile31  =  0.3625
r21  =  0.519447733627
r31  =  0.296794637992
shapiro_w  =  0.954539775848
skewness  =  -0.208962422871
slope_per10  =  -0.135121297693
slope_per90  =  0.233387743077
stetson_k  =  0.831967498876
weighted_mean  =  16.7290855913
weighted_std  =  0.224354623247
