-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.396928300917
cusum  =  0.102926948952
eta  =  0.534377652531
hl_amp_ratio  =  0.365826471178
kurtosis  =  0.35813695449
n_points  =  371
period  =  0.598634058323
period_SNR  =  37.3509500206
period_log10FAP  =  -39.4736487113
period_uncertainty  =  0.000101031876509
phase_cusum  =  0.230293243381
phase_eta  =  0.59269168449
phi21  =  0.819717780213
phi31  =  -1.45408803285
quartile31  =  0.49
r21  =  0.447145877972
r31  =  0.249209949678
shapiro_w  =  0.916949748993
skewness  =  -0.937295115463
slope_per10  =  -0.0821289978176
slope_per90  =  0.0829760121549
stetson_k  =  0.73302513109
weighted_mean  =  12.3421431787
weighted_std  =  0.361370146694
