-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.244917026314
cusum  =  0.11662878919
eta  =  0.621492100712
hl_amp_ratio  =  0.649805003082
kurtosis  =  -1.19016881603
n_points  =  239
period  =  0.559352217801
period_SNR  =  33.3380217132
period_log10FAP  =  -28.3305096529
period_uncertainty  =  0.000117141830855
phase_cusum  =  0.240019304035
phase_eta  =  0.106632121747
phi21  =  0.91669675402
phi31  =  -0.773455673692
quartile31  =  0.385
r21  =  0.572731456911
r31  =  0.276315405529
shapiro_w  =  0.949193298817
skewness  =  -0.189328587119
slope_per10  =  -0.146997527565
slope_per90  =  0.325920946091
stetson_k  =  0.840338066074
weighted_mean  =  14.3988007102
weighted_std  =  0.222589269437
