-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.293746204002
cusum  =  0.0676056791845
eta  =  0.588670943102
hl_amp_ratio  =  0.435619917625
kurtosis  =  -0.645885674693
n_points  =  298
period  =  0.56402977579
period_SNR  =  40.0953655139
period_log10FAP  =  -40.8324547546
period_uncertainty  =  0.000108086195433
phase_cusum  =  0.225081220683
phase_eta  =  0.0902556260674
phi21  =  0.903241820443
phi31  =  2.08265051354
quartile31  =  0.41
r21  =  0.48851650628
r31  =  0.318133206083
shapiro_w  =  0.917142271996
skewness  =  -0.694183880134
slope_per10  =  -0.178348802403
slope_per90  =  0.267999991775
stetson_k  =  0.743681481348
weighted_mean  =  14.7463471672
weighted_std  =  0.258569842142
