-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.211184114727
cusum  =  0.158608758048
eta  =  0.841369816286
hl_amp_ratio  =  0.570891223146
kurtosis  =  -0.456030555681
n_points  =  263
period  =  0.613459856992
period_SNR  =  38.8905658751
period_log10FAP  =  -28.1438042781
period_uncertainty  =  0.000184665836579
phase_cusum  =  0.236649163691
phase_eta  =  0.398836546547
phi21  =  0.987132636684
phi31  =  2.04440600808
quartile31  =  0.255
r21  =  0.482098410798
r31  =  0.303849833816
shapiro_w  =  0.961630403996
skewness  =  -0.54404245691
slope_per10  =  -0.135683893526
slope_per90  =  0.126133765805
stetson_k  =  0.759773501489
weighted_mean  =  16.9434587269
weighted_std  =  0.185535977428
