-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.195217322993
cusum  =  0.206007221587
eta  =  0.651781926219
hl_amp_ratio  =  0.457988722191
kurtosis  =  0.773967781181
n_points  =  132
period  =  0.512062346084
period_SNR  =  15.9246673457
period_log10FAP  =  -8.192749867
period_uncertainty  =  0.000202076726663
phase_cusum  =  0.253589439527
phase_eta  =  0.511376467926
phi21  =  0.921793192225
phi31  =  1.63017514278
quartile31  =  0.16
r21  =  0.53968397065
r31  =  0.281115555322
shapiro_w  =  0.868683815002
skewness  =  -1.19930596065
slope_per10  =  -0.33049999387
slope_per90  =  0.20168906953
stetson_k  =  0.632360682187
weighted_mean  =  15.6208375179
weighted_std  =  0.196209329492
