-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.316475986219
cusum  =  0.0943095580834
eta  =  0.533783576213
hl_amp_ratio  =  0.47192713368
kurtosis  =  -0.725909995602
n_points  =  244
period  =  0.47226435273
period_SNR  =  30.5585357539
period_log10FAP  =  -26.3087350496
period_uncertainty  =  0.000115769989694
phase_cusum  =  0.279880125374
phase_eta  =  0.148302149991
phi21  =  -2.34253093914
phi31  =  -4.15863087225
quartile31  =  0.4525
r21  =  0.547432808477
r31  =  0.412159768639
shapiro_w  =  0.935057342052
skewness  =  -0.583302085409
slope_per10  =  -0.145648172401
slope_per90  =  0.287075004308
stetson_k  =  0.782147226512
weighted_mean  =  13.2182016218
weighted_std  =  0.321728251329
