-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.184958253091
cusum  =  0.143219759255
eta  =  0.54145454827
hl_amp_ratio  =  0.887233685404
kurtosis  =  -0.533312520219
n_points  =  339
period  =  0.623801923513
period_SNR  =  39.2274991173
period_log10FAP  =  -40.2076809434
period_uncertainty  =  0.000110454342072
phase_cusum  =  0.216571981792
phase_eta  =  0.292351615156
phi21  =  -2.13069534833
phi31  =  -3.60080140201
quartile31  =  0.24
r21  =  0.471466223566
r31  =  0.182623074365
shapiro_w  =  0.987625181675
skewness  =  -0.179522813325
slope_per10  =  -0.136294525875
slope_per90  =  0.176303407701
stetson_k  =  0.812294571421
weighted_mean  =  15.8758943392
weighted_std  =  0.161950116761
