-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.337586959191
cusum  =  0.14000219268
eta  =  0.429861371108
hl_amp_ratio  =  0.282095206191
kurtosis  =  -0.393591426844
n_points  =  384
period  =  0.590903629069
period_SNR  =  46.7257124859
period_log10FAP  =  -50.9547139755
period_uncertainty  =  0.000116587369695
phase_cusum  =  0.233971556778
phase_eta  =  0.145072613378
phi21  =  -2.27002326021
phi31  =  -1.17112329546
quartile31  =  0.38
r21  =  0.475218399207
r31  =  0.258317966285
shapiro_w  =  0.891374289989
skewness  =  -0.860393949365
slope_per10  =  -0.122960799023
slope_per90  =  0.230317685054
stetson_k  =  0.697790624516
weighted_mean  =  14.6759731409
weighted_std  =  0.287693571065
