-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.78


######### Lightcurve features #########

amplitude  =  0.320022277001
cusum  =  0.373025844082
eta  =  0.875118653188
hl_amp_ratio  =  0.76334846172
kurtosis  =  -1.60774213533
n_points  =  12
period  =  0.655899972584
period_SNR  =  3.2857022105
period_log10FAP  =  0.0
period_uncertainty  =  0.000449554681775
phase_cusum  =  0.413041083342
phase_eta  =  0.679217157519
phi21  =  0.0586955235282
phi31  =  -0.686162592643
quartile31  =  0.4625
r21  =  0.674977422699
r31  =  0.350838467682
shapiro_w  =  0.87750428915
skewness  =  -0.139130354109
slope_per10  =  -0.678813296587
slope_per90  =  0.18600000379
stetson_k  =  0.917295688483
weighted_mean  =  16.3228414097
weighted_std  =  0.243528732538
