-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.228925997629
cusum  =  0.197800764869
eta  =  0.534338740892
hl_amp_ratio  =  0.558806025803
kurtosis  =  -1.08294988039
n_points  =  239
period  =  0.64030392411
period_SNR  =  36.1362406214
period_log10FAP  =  -31.0901435199
period_uncertainty  =  0.000201179477929
phase_cusum  =  0.318105048701
phase_eta  =  0.174486241328
phi21  =  -2.11199662282
phi31  =  -0.643605505895
quartile31  =  0.34
r21  =  0.515196945531
r31  =  0.262697453772
shapiro_w  =  0.955618560314
skewness  =  -0.253016493481
slope_per10  =  -0.238499999978
slope_per90  =  0.284333340824
stetson_k  =  0.817595346542
weighted_mean  =  15.7210913568
weighted_std  =  0.203467068996
