-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.274357329607
cusum  =  0.143619494151
eta  =  0.646151081309
hl_amp_ratio  =  0.461521918186
kurtosis  =  -0.747681257672
n_points  =  282
period  =  0.597742810453
period_SNR  =  41.1964097128
period_log10FAP  =  -34.0563068682
period_uncertainty  =  0.00012909283097
phase_cusum  =  0.353494722378
phase_eta  =  0.0622463446065
phi21  =  0.871512005866
phi31  =  2.00488492558
quartile31  =  0.3575
r21  =  0.534784212345
r31  =  0.373039411642
shapiro_w  =  0.938476979733
skewness  =  -0.543586864224
slope_per10  =  -0.183532604141
slope_per90  =  0.303277739851
stetson_k  =  0.772559956024
weighted_mean  =  14.7996987315
weighted_std  =  0.234555249171
