-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.361070470693
cusum  =  0.119047953784
eta  =  0.919173806304
hl_amp_ratio  =  0.262689526481
kurtosis  =  0.00244451850839
n_points  =  136
period  =  0.454487410442
period_SNR  =  26.2722785976
period_log10FAP  =  -14.3780498929
period_uncertainty  =  0.000121683385012
phase_cusum  =  0.269089215443
phase_eta  =  0.215545728508
phi21  =  -2.60007935044
phi31  =  -1.99282173423
quartile31  =  0.365
r21  =  0.470408598344
r31  =  0.242537490037
shapiro_w  =  0.84340518713
skewness  =  -1.09410561472
slope_per10  =  -0.175641885854
slope_per90  =  0.257440975719
stetson_k  =  0.658847082578
weighted_mean  =  15.6250375788
weighted_std  =  0.291041049635
