-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.295661247172
cusum  =  0.130464902338
eta  =  0.517100458324
hl_amp_ratio  =  0.344693642771
kurtosis  =  0.0617979676933
n_points  =  326
period  =  0.649447897176
period_SNR  =  38.7237520314
period_log10FAP  =  -40.2523151334
period_uncertainty  =  0.000143302720387
phase_cusum  =  0.276707103793
phase_eta  =  0.188397534435
phi21  =  0.982964124515
phi31  =  2.02798965695
quartile31  =  0.2175
r21  =  0.488717377306
r31  =  0.219272561419
shapiro_w  =  0.873213350773
skewness  =  -1.0478779599
slope_per10  =  -0.118706270852
slope_per90  =  0.267347920989
stetson_k  =  0.69868832791
weighted_mean  =  13.360722135
weighted_std  =  0.250986961759
