-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.255806679712
cusum  =  0.163758818062
eta  =  0.559935470167
hl_amp_ratio  =  0.644306104839
kurtosis  =  -0.769779069295
n_points  =  273
period  =  0.759164690029
period_SNR  =  37.3849375643
period_log10FAP  =  -31.8703721514
period_uncertainty  =  0.000261375368409
phase_cusum  =  0.301376000081
phase_eta  =  0.183882975919
phi21  =  1.28602611024
phi31  =  2.52729303306
quartile31  =  0.34
r21  =  0.610015074194
r31  =  0.319367816987
shapiro_w  =  0.957517027855
skewness  =  -0.356386767787
slope_per10  =  -0.206730456803
slope_per90  =  0.211802818483
stetson_k  =  0.763979838344
weighted_mean  =  15.9380720634
weighted_std  =  0.231410203532
