-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.344280826879
cusum  =  0.170323166243
eta  =  0.658334965586
hl_amp_ratio  =  0.287269977072
kurtosis  =  -0.126386925962
n_points  =  218
period  =  0.488016659959
period_SNR  =  31.3417033938
period_log10FAP  =  -23.2357910008
period_uncertainty  =  0.000112252256276
phase_cusum  =  0.198506680692
phase_eta  =  0.39442807267
phi21  =  -2.4822466207
phi31  =  -1.61181164113
quartile31  =  0.3575
r21  =  0.445765809481
r31  =  0.183186791886
shapiro_w  =  0.891435682774
skewness  =  -0.838146019372
slope_per10  =  -0.10645057898
slope_per90  =  0.231553980207
stetson_k  =  0.687120895683
weighted_mean  =  15.4020950727
weighted_std  =  0.271144804586
