-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.287110759844
cusum  =  0.211313068512
eta  =  0.521896600852
hl_amp_ratio  =  0.638824325557
kurtosis  =  -0.700224174336
n_points  =  282
period  =  0.67117411059
period_SNR  =  37.7399525146
period_log10FAP  =  -33.1745875975
period_uncertainty  =  0.000129032246694
phase_cusum  =  0.248724883969
phase_eta  =  0.382373796862
phi21  =  -2.11623771093
phi31  =  -0.831602142735
quartile31  =  0.44
r21  =  0.475593024085
r31  =  0.276880111488
shapiro_w  =  0.937506198883
skewness  =  -0.577543628413
slope_per10  =  -0.119424752098
slope_per90  =  0.280559855736
stetson_k  =  0.806819228168
weighted_mean  =  14.7076589953
weighted_std  =  0.267908374128
