-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.327804463181
cusum  =  0.14292827964
eta  =  0.592332981659
hl_amp_ratio  =  0.656291535458
kurtosis  =  -0.87189487273
n_points  =  252
period  =  0.756845908613
period_SNR  =  36.6971960654
period_log10FAP  =  -31.7012330686
period_uncertainty  =  0.000198751565338
phase_cusum  =  0.262205816581
phase_eta  =  0.197178354785
phi21  =  1.16286562924
phi31  =  -0.738902509804
quartile31  =  0.3825
r21  =  0.436657805026
r31  =  0.230909710322
shapiro_w  =  0.952355504036
skewness  =  -0.40061830667
slope_per10  =  -0.200824515721
slope_per90  =  0.420372764384
stetson_k  =  0.824225658679
weighted_mean  =  12.7210383517
weighted_std  =  0.253792657363
