-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.301169756334
cusum  =  0.195939497451
eta  =  0.533425461067
hl_amp_ratio  =  0.522324250213
kurtosis  =  -0.359518407517
n_points  =  196
period  =  0.548312108983
period_SNR  =  25.7914059066
period_log10FAP  =  -25.2730935344
period_uncertainty  =  0.000140954278393
phase_cusum  =  0.260556212275
phase_eta  =  0.164335007867
phi21  =  -2.21924659854
phi31  =  -3.97541600422
quartile31  =  0.31
r21  =  0.492771189814
r31  =  0.36777881042
shapiro_w  =  0.938394427299
skewness  =  -0.679948278192
slope_per10  =  -0.186037939274
slope_per90  =  0.297977619166
stetson_k  =  0.784463363657
weighted_mean  =  15.7454824729
weighted_std  =  0.235112635378
