-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  LPV_Mira_AGB_C
class_probability =  0.56


######### Lightcurve features #########

amplitude  =  0.592432338865
cusum  =  0.128658368444
eta  =  2.2357812149
hl_amp_ratio  =  0.95752640407
kurtosis  =  -1.33001160343
n_points  =  382
period  =  398.978539565
period_SNR  =  13.8219909234
period_log10FAP  =  -0.73759752042
period_uncertainty  =  86.3671191529
phase_cusum  =  0.111185998688
phase_eta  =  2.05149220243
phi21  =  0.486276443795
phi31  =  0.28349326189
quartile31  =  1.905
r21  =  0.401103127951
r31  =  0.19207260655
shapiro_w  =  0.931786179543
skewness  =  0.0397418425879
slope_per10  =  -1.9680383155
slope_per90  =  0.433802686838
stetson_k  =  0.910895671651
weighted_mean  =  11.9803926702
weighted_std  =  1.03323291888
