-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.170330912781
cusum  =  0.1318538033
eta  =  0.543739811736
hl_amp_ratio  =  0.501271723678
kurtosis  =  -1.05200862833
n_points  =  265
period  =  0.621409770471
period_SNR  =  37.4300571994
period_log10FAP  =  -35.7623745365
period_uncertainty  =  0.000109372322753
phase_cusum  =  0.316552147604
phase_eta  =  0.0797529984525
phi21  =  0.984460853941
phi31  =  -0.503563402528
quartile31  =  0.23
r21  =  0.442632913687
r31  =  0.232428709973
shapiro_w  =  0.93059438467
skewness  =  -0.435271475382
slope_per10  =  -0.27908461043
slope_per90  =  0.475704979654
stetson_k  =  0.810741119854
weighted_mean  =  14.6514195809
weighted_std  =  0.134113401956
