-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.274348871848
cusum  =  0.135860855494
eta  =  0.491448390639
hl_amp_ratio  =  0.532324652549
kurtosis  =  -0.824762947215
n_points  =  428
period  =  0.62669471278
period_SNR  =  45.9547146713
period_log10FAP  =  -51.1012805227
period_uncertainty  =  0.000131226650434
phase_cusum  =  0.263224638263
phase_eta  =  0.413150748939
phi21  =  4.08935709969
phi31  =  5.22454038334
quartile31  =  0.44
r21  =  0.481548007884
r31  =  0.310226632341
shapiro_w  =  0.953891336918
skewness  =  -0.435482656296
slope_per10  =  -0.075859556911
slope_per90  =  0.0572874909502
stetson_k  =  0.801665252784
weighted_mean  =  12.5700234009
weighted_std  =  0.269896263798
