-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.343549331002
cusum  =  0.143246527705
eta  =  0.650291163777
hl_amp_ratio  =  0.471269071069
kurtosis  =  -0.680304033227
n_points  =  184
period  =  0.566740356159
period_SNR  =  24.0948453841
period_log10FAP  =  -18.7976539486
period_uncertainty  =  0.00019042417181
phase_cusum  =  0.302151571153
phase_eta  =  0.417597397874
phi21  =  1.12147335258
phi31  =  1.96765972436
quartile31  =  0.48
r21  =  0.450889058179
r31  =  0.322180218066
shapiro_w  =  0.931476354599
skewness  =  -0.536909457204
slope_per10  =  -0.103194299371
slope_per90  =  0.292680240958
stetson_k  =  0.792032263238
weighted_mean  =  13.7252896107
weighted_std  =  0.335652257683
