-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.321348177585
cusum  =  0.23756126159
eta  =  0.613855997223
hl_amp_ratio  =  0.514915469071
kurtosis  =  -0.628428446612
n_points  =  99
period  =  0.622133013736
period_SNR  =  14.6301123603
period_log10FAP  =  -8.59328170702
period_uncertainty  =  0.000112440454375
phase_cusum  =  0.27699760789
phase_eta  =  0.237429596167
phi21  =  -2.01661344188
phi31  =  -0.904400778766
quartile31  =  0.31
r21  =  0.545043050702
r31  =  0.242393320418
shapiro_w  =  0.933178007603
skewness  =  -0.595022012647
slope_per10  =  -0.228516676774
slope_per90  =  0.502687111494
stetson_k  =  0.782322845954
weighted_mean  =  14.4282442052
weighted_std  =  0.263446451073
