-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.538739008831
cusum  =  0.177234924235
eta  =  0.432691378969
hl_amp_ratio  =  0.235806744612
kurtosis  =  -0.503318406395
n_points  =  249
period  =  0.550121733559
period_SNR  =  41.0815432215
period_log10FAP  =  -36.5298995392
period_uncertainty  =  0.000130528518314
phase_cusum  =  0.227194722078
phase_eta  =  0.177252220398
phi21  =  0.838198604202
phi31  =  1.62240042054
quartile31  =  0.73
r21  =  0.36841770533
r31  =  0.208106185884
shapiro_w  =  0.857053816319
skewness  =  -0.88345052199
slope_per10  =  -0.145426332848
slope_per90  =  0.151550964503
stetson_k  =  0.709204396145
weighted_mean  =  12.1236661669
weighted_std  =  0.473850446214
