<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.28097017165
cusum  =  0.0994799377625
eta  =  0.582637190819
hl_amp_ratio  =  0.528481194268
kurtosis  =  -0.339895663221
n_points  =  332
period  =  0.51257756464
period_SNR  =  43.3395943694
period_log10FAP  =  -44.5016242905
period_uncertainty  =  8.95488435158e-05
phase_cusum  =  0.268228158202
phase_eta  =  0.300129808092
phi21  =  0.666191568179
phi31  =  1.1300742233
quartile31  =  0.34
r21  =  0.342305138058
r31  =  0.218217923249
shapiro_w  =  0.944713175297
skewness  =  -0.570945117454
slope_per10  =  -0.0954736011436
slope_per90  =  0.108429601282
stetson_k  =  0.760217838692
weighted_mean  =  16.5071717848
weighted_std  =  0.249463192357
</pre></body></html>