-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.320227856368
cusum  =  0.117268523587
eta  =  0.545686520575
hl_amp_ratio  =  0.361794447626
kurtosis  =  -0.939965146961
n_points  =  316
period  =  0.630346743755
period_SNR  =  35.9461086598
period_log10FAP  =  -37.4056489689
period_uncertainty  =  0.000108136066967
phase_cusum  =  0.228885579348
phase_eta  =  0.331538135653
phi21  =  -2.21427001321
phi31  =  -0.880971080888
quartile31  =  0.48
r21  =  0.493657193392
r31  =  0.291361538742
shapiro_w  =  0.913274407387
skewness  =  -0.565431149944
slope_per10  =  -0.108853733335
slope_per90  =  0.218471975379
stetson_k  =  0.768702420854
weighted_mean  =  12.8558320127
weighted_std  =  0.287883339218
