-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.28035029886
cusum  =  0.109020586239
eta  =  0.478577673606
hl_amp_ratio  =  0.560464474896
kurtosis  =  -0.64508662941
n_points  =  369
period  =  0.578930872501
period_SNR  =  43.9834027504
period_log10FAP  =  -45.378702145
period_uncertainty  =  0.000114973698266
phase_cusum  =  0.238674103549
phase_eta  =  0.125325588718
phi21  =  0.728788186719
phi31  =  -1.26647561726
quartile31  =  0.35
r21  =  0.496548961823
r31  =  0.328061412091
shapiro_w  =  0.93061119318
skewness  =  -0.597190023446
slope_per10  =  -0.171476481016
slope_per90  =  0.201678025242
stetson_k  =  0.792613469258
weighted_mean  =  16.0522246445
weighted_std  =  0.246515664268
