-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.8


######### Lightcurve features #########

amplitude  =  0.227831639584
cusum  =  0.143032800169
eta  =  0.49185726589
hl_amp_ratio  =  0.762531166293
kurtosis  =  -0.238356858844
n_points  =  349
period  =  0.531065362778
period_SNR  =  26.7579391126
period_log10FAP  =  -25.087950856
period_uncertainty  =  0.000190368770693
phase_cusum  =  0.224607930969
phase_eta  =  0.981627299645
phi21  =  -2.8544668826
phi31  =  -3.4386051554
quartile31  =  0.37
r21  =  0.137845539636
r31  =  0.104269636785
shapiro_w  =  0.967347145081
skewness  =  -0.527316384927
slope_per10  =  -0.045265325699
slope_per90  =  0.0682842799485
stetson_k  =  0.817748283737
weighted_mean  =  13.6204446806
weighted_std  =  0.238162625736
