-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.214458466242
cusum  =  0.105120936223
eta  =  0.662931573194
hl_amp_ratio  =  0.484097300752
kurtosis  =  -0.864765929821
n_points  =  284
period  =  0.673243226251
period_SNR  =  37.2044641523
period_log10FAP  =  -37.0546009851
period_uncertainty  =  0.000102989634696
phase_cusum  =  0.273323947253
phase_eta  =  0.310098062421
phi21  =  -2.1000671899
phi31  =  -3.66758987794
quartile31  =  0.28
r21  =  0.35528580029
r31  =  0.241392448686
shapiro_w  =  0.950037360191
skewness  =  -0.420310618216
slope_per10  =  -0.169297776883
slope_per90  =  0.261102893855
stetson_k  =  0.791358094932
weighted_mean  =  16.5814461631
weighted_std  =  0.172864862086
