-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.166381958694
cusum  =  0.256562587356
eta  =  0.577731005399
hl_amp_ratio  =  1.05581537214
kurtosis  =  0.0823539906622
n_points  =  319
period  =  0.176623319922
period_SNR  =  19.7248929921
period_log10FAP  =  -14.7508411136
period_uncertainty  =  8.92704245373e-06
phase_cusum  =  0.21562734689
phase_eta  =  1.39052742333
phi21  =  -0.148215543189
phi31  =  0.890388722842
quartile31  =  0.295
r21  =  0.187173289188
r31  =  0.151090913491
shapiro_w  =  0.982440114021
skewness  =  -0.336812869485
slope_per10  =  -0.0160721305108
slope_per90  =  0.017643656335
stetson_k  =  0.799690012301
weighted_mean  =  12.1833875197
weighted_std  =  0.219081742679
