-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.334540347874
cusum  =  0.119443366041
eta  =  0.587086974165
hl_amp_ratio  =  0.362852408964
kurtosis  =  -0.807805935354
n_points  =  325
period  =  0.649467068514
period_SNR  =  35.7856266569
period_log10FAP  =  -38.0273338816
period_uncertainty  =  0.000114795511877
phase_cusum  =  0.268574556833
phase_eta  =  0.464440478926
phi21  =  -2.24080493635
phi31  =  -0.901184980067
quartile31  =  0.49
r21  =  0.432573292095
r31  =  0.243168206096
shapiro_w  =  0.910973370075
skewness  =  -0.643009468839
slope_per10  =  -0.174574689679
slope_per90  =  0.128703133423
stetson_k  =  0.774659574086
weighted_mean  =  12.784651745
weighted_std  =  0.295159783511
