-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.249299509072
cusum  =  0.09490000493
eta  =  1.087621529
hl_amp_ratio  =  0.759952010522
kurtosis  =  -0.103431890486
n_points  =  197
period  =  0.556891163309
period_SNR  =  27.975195308
period_log10FAP  =  -16.2799749192
period_uncertainty  =  0.000109617056273
phase_cusum  =  0.215490205509
phase_eta  =  0.619946338921
phi21  =  -2.49325281151
phi31  =  -0.913731398364
quartile31  =  0.35
r21  =  0.453916381846
r31  =  0.323480706708
shapiro_w  =  0.977384924889
skewness  =  0.0410920949847
slope_per10  =  -0.14109590991
slope_per90  =  0.194720164385
stetson_k  =  0.809993383836
weighted_mean  =  13.5592785229
weighted_std  =  0.253307204051
