-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.20291758358
cusum  =  0.10336042057
eta  =  0.601341622586
hl_amp_ratio  =  0.496432429257
kurtosis  =  -0.936215738196
n_points  =  367
period  =  0.680527900985
period_SNR  =  50.8083628888
period_log10FAP  =  -46.3872572415
period_uncertainty  =  0.000132008055084
phase_cusum  =  0.274869878818
phase_eta  =  0.108392934799
phi21  =  1.13295669365
phi31  =  -0.623583293206
quartile31  =  0.28
r21  =  0.521781129309
r31  =  0.314383941541
shapiro_w  =  0.940288543701
skewness  =  -0.454372959141
slope_per10  =  -0.24712165052
slope_per90  =  0.199600001797
stetson_k  =  0.794705462729
weighted_mean  =  14.524917429
weighted_std  =  0.177889384255
