-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.461857603682
cusum  =  0.280766762948
eta  =  1.20403909159
hl_amp_ratio  =  0.18173362102
kurtosis  =  0.984145428877
n_points  =  36
period  =  0.602581032089
period_SNR  =  9.82297554486
period_log10FAP  =  -0.795056923075
period_uncertainty  =  0.000232441412649
phase_cusum  =  0.338561866967
phase_eta  =  1.01463514456
phi21  =  0.873530401758
phi31  =  1.55429128863
quartile31  =  0.2875
r21  =  0.350602171869
r31  =  0.212474681327
shapiro_w  =  0.834497928619
skewness  =  -1.2511560905
slope_per10  =  -0.362599994987
slope_per90  =  0.429793434523
stetson_k  =  0.610337990455
weighted_mean  =  12.8600314713
weighted_std  =  0.278913818179
