-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.287737991566
cusum  =  0.0917823779816
eta  =  0.533777707362
hl_amp_ratio  =  0.439142224246
kurtosis  =  -1.01778551044
n_points  =  331
period  =  0.640319870044
period_SNR  =  45.2843189323
period_log10FAP  =  -44.9841835155
period_uncertainty  =  0.000117541649673
phase_cusum  =  0.292777291594
phase_eta  =  0.218729717097
phi21  =  -2.34498835729
phi31  =  -1.14543646376
quartile31  =  0.44
r21  =  0.38693553826
r31  =  0.318408148105
shapiro_w  =  0.91130053997
skewness  =  -0.519139888239
slope_per10  =  -0.161715854312
slope_per90  =  0.403504224014
stetson_k  =  0.81452099009
weighted_mean  =  14.0912861712
weighted_std  =  0.257105902792
