-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.24685075663
cusum  =  0.100880440302
eta  =  0.646817692787
hl_amp_ratio  =  0.354826281281
kurtosis  =  -0.126145387497
n_points  =  246
period  =  0.558899368443
period_SNR  =  35.1259961538
period_log10FAP  =  -28.9920201154
period_uncertainty  =  0.000114976217259
phase_cusum  =  0.254499416759
phase_eta  =  0.233075675612
phi21  =  0.907172131306
phi31  =  2.02780112428
quartile31  =  0.2575
r21  =  0.457056377509
r31  =  0.205866739556
shapiro_w  =  0.906793892384
skewness  =  -0.747091167522
slope_per10  =  -0.123482729587
slope_per90  =  0.277217798681
stetson_k  =  0.689494025677
weighted_mean  =  15.347777764
weighted_std  =  0.201433407218
