-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.181467713531
cusum  =  0.146715020811
eta  =  0.519125665908
hl_amp_ratio  =  0.906671708971
kurtosis  =  -0.740112959107
n_points  =  198
period  =  0.640523599728
period_SNR  =  29.5806206787
period_log10FAP  =  -23.8404308936
period_uncertainty  =  0.000120835274225
phase_cusum  =  0.232432315409
phase_eta  =  0.274040870557
phi21  =  -1.88652860839
phi31  =  -4.35944241801
quartile31  =  0.2475
r21  =  0.402224736423
r31  =  0.0638645505816
shapiro_w  =  0.976312756538
skewness  =  -0.268805805181
slope_per10  =  -0.285299999329
slope_per90  =  0.426354192483
stetson_k  =  0.821307029786
weighted_mean  =  13.9414537279
weighted_std  =  0.145582840716
