-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.48


######### Lightcurve features #########

amplitude  =  0.127366402882
cusum  =  0.0950552087829
eta  =  1.24321079408
hl_amp_ratio  =  1.08160430924
kurtosis  =  -0.420596841574
n_points  =  396
period  =  0.219029719702
period_SNR  =  50.6691273454
period_log10FAP  =  -36.6298930535
period_uncertainty  =  1.34278501491e-05
phase_cusum  =  0.216637153644
phase_eta  =  0.942932631379
phi21  =  3.92245690274
phi31  =  2.29905494373
quartile31  =  0.21
r21  =  0.182978407074
r31  =  0.152473267576
shapiro_w  =  0.993793785572
skewness  =  0.043894243957
slope_per10  =  -0.0324028216262
slope_per90  =  0.0224288603329
stetson_k  =  0.815095738803
weighted_mean  =  17.7430712472
weighted_std  =  0.133057354389
