-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.39


######### Lightcurve features #########

amplitude  =  0.279914177938
cusum  =  0.170193936733
eta  =  0.510853250291
hl_amp_ratio  =  0.767971622556
kurtosis  =  -0.600931247092
n_points  =  261
period  =  0.533917699762
period_SNR  =  36.577769657
period_log10FAP  =  -37.3295833154
period_uncertainty  =  8.13502120403e-05
phase_cusum  =  0.202369709782
phase_eta  =  0.494921476155
phi21  =  -2.98745903419
phi31  =  -1.48065610924
quartile31  =  0.37
r21  =  0.11438302773
r31  =  0.0827570358647
shapiro_w  =  0.956470906734
skewness  =  -0.489922273399
slope_per10  =  -0.14976897936
slope_per90  =  0.143320308848
stetson_k  =  0.819352836062
weighted_mean  =  15.9641060344
weighted_std  =  0.242902428255
