-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.210915363785
cusum  =  0.163072950015
eta  =  0.571407013419
hl_amp_ratio  =  0.764895919716
kurtosis  =  -0.746513276248
n_points  =  283
period  =  0.619584681509
period_SNR  =  34.2150778909
period_log10FAP  =  -31.9977484618
period_uncertainty  =  0.000148979560844
phase_cusum  =  0.294483652395
phase_eta  =  0.546277291148
phi21  =  1.32059906502
phi31  =  -0.631279876498
quartile31  =  0.315
r21  =  0.417339127826
r31  =  0.121633185667
shapiro_w  =  0.974256515503
skewness  =  -0.269465561271
slope_per10  =  -0.218999998954
slope_per90  =  0.233872601154
stetson_k  =  0.8328976268
weighted_mean  =  15.1573733131
weighted_std  =  0.197170711217
