-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.314061745768
cusum  =  0.12263319969
eta  =  0.655864949343
hl_amp_ratio  =  0.580120271266
kurtosis  =  -0.95741232581
n_points  =  260
period  =  0.574621261664
period_SNR  =  42.514094049
period_log10FAP  =  -35.8567854355
period_uncertainty  =  0.00018879659735
phase_cusum  =  0.242998721247
phase_eta  =  0.14826694329
phi21  =  0.944197951387
phi31  =  -1.06599456936
quartile31  =  0.45
r21  =  0.410936458204
r31  =  0.241028854543
shapiro_w  =  0.949634075165
skewness  =  -0.309559488098
slope_per10  =  -0.132216252872
slope_per90  =  0.171741785816
stetson_k  =  0.801278289044
weighted_mean  =  14.7808463265
weighted_std  =  0.277869129001
