-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.287159804177
cusum  =  0.157837370355
eta  =  0.88329919557
hl_amp_ratio  =  0.506134083403
kurtosis  =  -1.09483758611
n_points  =  180
period  =  0.735781177655
period_SNR  =  31.6465328822
period_log10FAP  =  -19.564623837
period_uncertainty  =  0.000185148773086
phase_cusum  =  0.209740908225
phase_eta  =  0.220013055208
phi21  =  -2.16311611543
phi31  =  -0.609259536013
quartile31  =  0.4325
r21  =  0.44747041421
r31  =  0.193851271537
shapiro_w  =  0.932192921638
skewness  =  -0.408363469855
slope_per10  =  -0.291590651132
slope_per90  =  0.301200404496
stetson_k  =  0.792143783717
weighted_mean  =  15.6369696979
weighted_std  =  0.262011574811
