-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.302086847586
cusum  =  0.185979229411
eta  =  0.565955533723
hl_amp_ratio  =  0.303271693154
kurtosis  =  -0.322676263
n_points  =  337
period  =  0.543440471372
period_SNR  =  40.8210433956
period_log10FAP  =  -42.9419107925
period_uncertainty  =  0.000100575044032
phase_cusum  =  0.287406930623
phase_eta  =  0.317620148572
phi21  =  0.698828798395
phi31  =  -1.4288078547
quartile31  =  0.31
r21  =  0.467108513687
r31  =  0.294695148114
shapiro_w  =  0.86886370182
skewness  =  -0.944177476882
slope_per10  =  -0.0995825001366
slope_per90  =  0.246035069272
stetson_k  =  0.705907540674
weighted_mean  =  14.9499095611
weighted_std  =  0.247115621031
