-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.245217944619
cusum  =  0.144078233158
eta  =  0.689829906969
hl_amp_ratio  =  0.672871469972
kurtosis  =  -0.857846388213
n_points  =  152
period  =  0.559407644701
period_SNR  =  22.8381579503
period_log10FAP  =  -16.7877787951
period_uncertainty  =  0.000110257078989
phase_cusum  =  0.268899920272
phase_eta  =  0.15904009689
phi21  =  0.968430116223
phi31  =  -0.95735017968
quartile31  =  0.3325
r21  =  0.512499082855
r31  =  0.295059093571
shapiro_w  =  0.953130543232
skewness  =  -0.425178993586
slope_per10  =  -0.26081675714
slope_per90  =  0.331423873357
stetson_k  =  0.784716110737
weighted_mean  =  15.5338781207
weighted_std  =  0.213903325216
