-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.210111241754
cusum  =  0.138540729886
eta  =  0.587470562983
hl_amp_ratio  =  0.61227750034
kurtosis  =  -0.826464509371
n_points  =  299
period  =  0.608472011143
period_SNR  =  35.8536002507
period_log10FAP  =  -33.6403228627
period_uncertainty  =  0.000100907467199
phase_cusum  =  0.23328710231
phase_eta  =  0.414815692612
phi21  =  -2.32111597798
phi31  =  -4.31823616315
quartile31  =  0.32
r21  =  0.471993352546
r31  =  0.224194367986
shapiro_w  =  0.94067209959
skewness  =  -0.518554335407
slope_per10  =  -0.128759435329
slope_per90  =  0.0896693959291
stetson_k  =  0.794375559034
weighted_mean  =  16.8949895619
weighted_std  =  0.212237290276
