-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.175213305167
cusum  =  0.0977704018174
eta  =  0.542990363054
hl_amp_ratio  =  0.718235709033
kurtosis  =  -0.455320653949
n_points  =  299
period  =  0.365851934277
period_SNR  =  25.5253281717
period_log10FAP  =  -24.3154433514
period_uncertainty  =  4.07280512346e-05
phase_cusum  =  0.184720013808
phase_eta  =  1.01385872802
phi21  =  -1.84388173851
phi31  =  -1.41227681763
quartile31  =  0.24
r21  =  0.0935828789079
r31  =  0.0468460420267
shapiro_w  =  0.959869921207
skewness  =  -0.542188605786
slope_per10  =  -0.049627844856
slope_per90  =  0.0605101652816
stetson_k  =  0.784926815348
weighted_mean  =  16.0184835492
weighted_std  =  0.178474609477
