-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.244552394884
cusum  =  0.14390702343
eta  =  0.54658454502
hl_amp_ratio  =  0.49848082943
kurtosis  =  0.0247003709661
n_points  =  425
period  =  0.681159426908
period_SNR  =  43.5970772757
period_log10FAP  =  -43.2629464964
period_uncertainty  =  0.000127081986878
phase_cusum  =  0.223548853185
phase_eta  =  0.409992496789
phi21  =  -2.27643388241
phi31  =  -4.10927823974
quartile31  =  0.25
r21  =  0.499298922788
r31  =  0.246514130261
shapiro_w  =  0.948224425316
skewness  =  -0.755398932488
slope_per10  =  -0.0782665687527
slope_per90  =  0.180761571545
stetson_k  =  0.757682286265
weighted_mean  =  13.1243377849
weighted_std  =  0.211411422127
