-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.191834932271
cusum  =  0.121319405499
eta  =  0.613673871028
hl_amp_ratio  =  0.742882322799
kurtosis  =  -1.22411132873
n_points  =  322
period  =  0.664276228407
period_SNR  =  44.96293481
period_log10FAP  =  -43.0411671345
period_uncertainty  =  0.000159375303898
phase_cusum  =  0.257941522617
phase_eta  =  0.360206543901
phi21  =  -1.73912069594
phi31  =  0.181810487855
quartile31  =  0.31
r21  =  0.472115417858
r31  =  0.0831610105082
shapiro_w  =  0.948518872261
skewness  =  -0.133110252924
slope_per10  =  -0.162786557912
slope_per90  =  0.254715945958
stetson_k  =  0.866731963702
weighted_mean  =  13.4118610026
weighted_std  =  0.180345798743
