<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.301171296576
cusum  =  0.112679678139
eta  =  0.560309744349
hl_amp_ratio  =  0.464978632658
kurtosis  =  -0.155374391613
n_points  =  139
period  =  0.396050321575
period_SNR  =  16.8531003462
period_log10FAP  =  -13.6700208529
period_uncertainty  =  4.47170904189e-05
phase_cusum  =  0.275218548532
phase_eta  =  0.218839577186
phi21  =  1.00693238742
phi31  =  -1.13532417958
quartile31  =  0.33
r21  =  0.528856444584
r31  =  0.327663798512
shapiro_w  =  0.890755712986
skewness  =  -0.916105678093
slope_per10  =  -0.155145200941
slope_per90  =  0.317108198377
stetson_k  =  0.736684164721
weighted_mean  =  13.5705943152
weighted_std  =  0.267803793094
</pre></body></html>